interface ComponentFactory.Krypton.Navigator.IDragPageNotify:

   method public void PageDragStart(input sender as System.Object, input navigator as ComponentFactory.Krypton.Navigator.KryptonNavigator, input e as ComponentFactory.Krypton.Navigator.PageDragCancelEventArgs).

   method public void PageDragMove(input sender as System.Object, input e as ComponentFactory.Krypton.Toolkit.PointEventArgs).

   method public logical PageDragEnd(input sender as System.Object, input e as ComponentFactory.Krypton.Toolkit.PointEventArgs).

   method public void PageDragQuit(input sender as System.Object).

end interface.
