interface ComponentFactory.Krypton.Toolkit.IKeyController:

   method public void KeyDown(input c as System.Windows.Forms.Control, input e as System.Windows.Forms.KeyEventArgs).

   method public void KeyPress(input c as System.Windows.Forms.Control, input e as System.Windows.Forms.KeyPressEventArgs).

   method public logical KeyUp(input c as System.Windows.Forms.Control, input e as System.Windows.Forms.KeyEventArgs).

end interface.
