class ComponentFactory.Krypton.Workspace.ActiveCellChangedEventArgs
   inherits System.EventArgs:

   def public property OldCell as ComponentFactory.Krypton.Workspace.KryptonWorkspaceCell
      get.

   def public property NewCell as ComponentFactory.Krypton.Workspace.KryptonWorkspaceCell
      get.

   constructor public ActiveCellChangedEventArgs(input oldCell as ComponentFactory.Krypton.Workspace.KryptonWorkspaceCell, input newCell as ComponentFactory.Krypton.Workspace.KryptonWorkspaceCell):
   end constructor.

end class.
