interface DataPA.System
   inherits DataPA._System:

   def public property Name as character
      get.
      set.

   def public property Description as character
      get.
      set.

   def public property Host as character
      get.
      set.

   def public property Service as character
      get.
      set.

   def public property AppService as character
      get.
      set.

   def public property URL as character
      get.
      set.

   def public property AppServerInfo as character
      get.
      set.

   def public property PromptUser as logical
      get.
      set.

   def public property Direct as logical
      get.
      set.

   def public property Systems as DataPA.Systems
      get.
      set.

   def public property UserName as character
      get.
      set.

   def public property Password as character
      get.
      set.

   def public property ActivateParameters as character
      get.
      set.

   def public property LanguageCode as character
      get.
      set.

   def public property LoginOrganisationCode as character
      get.
      set.

   def public property LoginDate as System.Object
      get.
      set.

   def public property PasswordEncoded as logical
      get.
      set.

   def public property DynamicsSec as logical
      get.
      set.

   def public property MultiLevel as logical
      get.
      set.

   def public property DataLocationURL as character
      get.

   def public property SystemType as character
      get.
      set.

   def public property Timeout as integer
      get.
      set.

   def public property SelectedConnection as character
      get.
      set.

   def public property Connections as vba.Collection
      get.

   def public property DefaultConnection as character
      get.
      set.

   def public property AdminConnection as character
      get.
      set.

   def public property LookupEdit as logical
      get.
      set.

   def public property SessionFree as logical
      get.
      set.

   def public property UseSSL as logical
      get.
      set.

   def public property ClientServer as logical
      get.
      set.

   def public property EnableTracing as logical
      get.
      set.

   def public property LoggingLevel as integer
      get.
      set.

   def public property LogFile as character
      get.
      set.

   def public property TcpClientRetry as integer
      get.
      set.

   def public property TcpClientRetryInterval as integer
      get.
      set.

   def public property EnableCompression as logical
      get.
      set.

   def public property CompressionThreshold as integer
      get.
      set.

   def public property CompressionLevel as integer
      get.
      set.

   method public void Refresh().

end interface.
