class DataPAClientConfig.SystemStructure
   inherits System.Object:

   def public property SystemName as character
      get.
      set.

   def public property PAConnection as RunDataPA.PAConnection
      get.
      set.

   def public property ConnectionName as character
      get.
      set.

   def public property ForceReload as logical
      get.
      set.

   def public property DataBase as System.Data.DataTable
      get.

   def public property DbTable as System.Data.DataTable
      get.

   def public property DbField as System.Data.DataTable
      get.

   def public property DbIndex as System.Data.DataTable
      get.

   def public property DbIdxField as System.Data.DataTable
      get.

   def public property Functions as System.Data.DataTable
      get.

   def public property Relation as System.Data.DataTable
      get.

   def public property FullStructure as System.Data.DataSet
      get.

   def public property ConnectSuccess as logical
      get.

   def public property ConnectError as character
      get.

   def public property LastRefresh as datetime
      get.

   def public property StructureAvailable as logical
      get.

   def public property LastLoadFromCache as logical
      get.

end class.
