interface Infragistics.UltraChart.Core.IRangeType:

   def public property RangeType as Infragistics.UltraChart.Shared.Styles.AxisRangeType
      get.
      set.

   def public property RangeMin as System.Object
      get.
      set.

   def public property RangeMax as System.Object
      get.
      set.

   def public property RangeRange as System.Object
      get.

end interface.
