interface Infragistics.Win.Touch.ISupportTouchMetrics:

   method public void OnTouchProviderRegistrationChanged(input touchProvider as Infragistics.Win.Touch.ITouchProvider, input touchProviderListVersion as integer).

   method public void OnTouchProviderStateChange(input invalidate as logical).

end interface.
