interface Infragistics.Win.UltraWinDock.IReceiveKeyMessage:

   method public void KeyDown(input e as System.Windows.Forms.KeyEventArgs).

   method public void KeyUp(input e as System.Windows.Forms.KeyEventArgs).

end interface.
