enum Infragistics.Win.UltraWinGrid.SummaryDisplayAreas flags:

   def enum
      None = 0
      Default = 1
      Top = 2
      TopFixed = 4
      Bottom = 8
      BottomFixed = 16
      InGroupByRows = 32
      GroupByRowsFooter = 64
      HideDataRowFooters = 128
      RootRowsFootersOnly = 256.

end enum.
