enum Infragistics.Win.UltraWinScrollBar.ScrollBarArrowStyle:

   def enum
      Default = 0
      BothAtLeftTop = 1
      BothAtRightBottom = 2
      BothAtEachEnd = 3
      None = 4
      OneAtEachEnd = 5.

end enum.
