class Infragistics.Win.UltraWinToolbars.ApplicationMenuAreaBase
   inherits Infragistics.Shared.SubObjectBase
   implements System.IDisposable, Infragistics.Win.UltraWinToolbars.IToolsCollectionOwner, System.Runtime.Serialization.ISerializable, System.Runtime.Serialization.IDeserializationCallback
   abstract:

   def public property MaxWidth as integer
      get.
      set.

   def public property MaxWidthResolved as integer
      get.

   def public property MinWidth as integer
      get.
      set.

   def public property MinWidthResolved as integer
      get.

   def public property NonInheritedTools as Infragistics.Win.UltraWinToolbars.NonInheritedTools
      get.

   def public property Settings as Infragistics.Win.UltraWinToolbars.ApplicationMenuAreaSettings
      get.

   def public property HasSettings as logical
      get.

   def public property SettingsResolved as Infragistics.Win.UltraWinToolbars.ApplicationMenuAreaSettingsResolved
      get.

   def public property Tools as Infragistics.Win.UltraWinToolbars.ToolsCollection
      get.

   def public abstract property UIRole as Infragistics.Win.AppStyling.UIRole
      get.

   def protected abstract property UIElement as Infragistics.Win.UIElement
      get.

   def public property AccessibilityObject as System.Windows.Forms.AccessibleObject
      get.

   constructor protected ApplicationMenuAreaBase(input info as System.Runtime.Serialization.SerializationInfo, input context as System.Runtime.Serialization.StreamingContext):
   end constructor.

   method protected final logical ShouldSerializeMaxWidth():
   end method.

   method public final void ResetMaxWidth():
   end method.

   method protected final logical ShouldSerializeMinWidth():
   end method.

   method public final void ResetMinWidth():
   end method.

   method protected final logical ShouldSerializeNonInheritedTools():
   end method.

   method public final void ResetNonInheritedTools():
   end method.

   method public final logical ShouldSerializeSettings():
   end method.

   method public final void ResetSettings():
   end method.

   method public final logical ShouldSerializeTools():
   end method.

   method public final void ResetTools():
   end method.

   method public void Reset():
   end method.

   method public logical ShouldSerialize():
   end method.

   method protected void GetObjectData(input info as System.Runtime.Serialization.SerializationInfo, input context as System.Runtime.Serialization.StreamingContext):
   end method.

   method protected abstract Infragistics.Win.UIElement GetUIElement(input parent as Infragistics.Win.UIElement).

   method protected void OnToolAddedToCollection(input tool as Infragistics.Win.UltraWinToolbars.ToolBase, input toolsCollection as Infragistics.Win.UltraWinToolbars.ToolsCollectionBase):
   end method.

   method protected void OnToolRemovedFromCollection(input tool as Infragistics.Win.UltraWinToolbars.ToolBase, input toolsCollection as Infragistics.Win.UltraWinToolbars.ToolsCollectionBase):
   end method.

   method protected override void OnDispose():
   end method.

   method protected override void OnSubObjectPropChanged(input propChange as Infragistics.Shared.PropChangeInfo):
   end method.

   method public override character ToString():
   end method.

end class.
