interface Infragistics.Win.UltraWinTree.IAdjustableLayoutItem:

   method public logical SupportsLeftRightAdjustmentsFromPoint(input point as System.Drawing.Point, input header as logical).

   method public logical SupportsUpDownAdjustmentsFromPoint(input point as System.Drawing.Point, input header as logical).

   method public void ApplyAdjustment(input delta as System.Drawing.Point, input dragElement as Infragistics.Win.UIElement).

   method public void GetAdjustmentRange(input point as System.Drawing.Point, input range as Infragistics.Win.UIElementAdjustmentRangeParams, input element as Infragistics.Win.UIElement, input resizeDirection as Infragistics.Win.UltraWinTree.LayoutItemResizeDirection).

   method public logical CanStartAdjustment(input e as System.Windows.Forms.MouseEventArgs, input allowSpanResizing as logical, input resizeDirection as System.Windows.Forms.Orientation, input element as Infragistics.Win.UIElement).

   method public void OnNewDeltaX(input newDeltaX as integer, input element as Infragistics.Win.UIElement).

   method public void OnNewDeltaY(input newDeltaX as integer, input element as Infragistics.Win.UIElement).

   method public System.Windows.Forms.Cursor GetAdjustableCursor(input point as System.Drawing.Point, input allowSpanResizing as logical, input resizeDirection as Infragistics.Win.UltraWinTree.LayoutItemResizeDirection).

   method public void OnElementAdjustmentAborted().

end interface.
