enum Infragistics.Win.UltraWinTree.UltraTreeState flags:

   def enum
      InEdit = 1
      IsCheckbox = 2
      NodeFirst = 4
      NodeLast = 8
      NodeChild = 16
      NodeExpandable = 32
      NodeExpanded = 64
      NodeNotExpandable = 128
      NodeHasChildren = 256
      IsOptionButton = 512
      AllowCut = 1024
      AllowCopy = 2048
      AllowPaste = 4096
      ActiveCell = 8192
      CellInEditMode = 16384
      FirstCellActive = 32768
      LastCellActive = 65536
      HasNodeChangesPending = 131072
      PreviousNodeDisplaysCells = 262144
      NextNodeDisplaysCells = 524288
      ActiveCellIsOnLastLogicalRow = 1048576
      ActiveCellIsOnFirstLogicalRow = 2097152
      ActiveCellIsInFirstLogicalColumn = 4194304
      ActiveCellIsInLastLogicalColumn = 8388608
      FirstNodeActive = 16777216
      LastNodeActive = 33554432
      TabKeyNavigatesToNextCell = 67108864
      TabKeyNavigatesToNextControl = 134217728
      ActiveNodeDisplaysCells = 268435456
      NoFocusRect = 536870912.

end enum.
