interface Progress.Common.EhnLog.LogContext:

   def public property LogContextName as character
      get.

   def public property MsgHdr as character
      get.
      set.

   def public property LogEntries as int64
      get.

   def public property LogSubLevelUsed as logical
      get.

   def public property LogSublevelArray as System.Byte extent
      get.

   method public void initSubsystemNames().

   method public character getSubsystemName(input nameIndex as integer).

   method public character subsystemNameAt(input index as integer).

   method public character setMsgHdr(input hdrFormat as character, input hdrTokens as System.Object extent).

   method public int64 getEntrytypeBitAt(input index as integer).

   method public character parseEntrytypeString(input entrytypesString as character, input logginglevel as integer).

end interface.
