enum System.Diagnostics.ThreadPriorityLevel:

   def enum
      Normal = 0
      AboveNormal = 1
      Highest = 2
      TimeCritical = 15
      Idle = -15
      Lowest = -2
      BelowNormal = -1.

end enum.
