enum System.Net.FtpStatusCode:

   def enum
      Undefined = 0
      RestartMarker = 110
      ServiceTemporarilyNotAvailable = 120
      DataAlreadyOpen = 125
      OpeningData = 150
      CommandOK = 200
      CommandExtraneous = 202
      DirectoryStatus = 212
      FileStatus = 213
      SystemType = 215
      SendUserCommand = 220
      ClosingControl = 221
      ClosingData = 226
      EnteringPassive = 227
      LoggedInProceed = 230
      ServerWantsSecureSession = 234
      FileActionOK = 250
      PathnameCreated = 257
      SendPasswordCommand = 331
      NeedLoginAccount = 332
      FileCommandPending = 350
      ServiceNotAvailable = 421
      CantOpenData = 425
      ConnectionClosed = 426
      ActionNotTakenFileUnavailableOrBusy = 450
      ActionAbortedLocalProcessingError = 451
      ActionNotTakenInsufficientSpace = 452
      CommandSyntaxError = 500
      ArgumentSyntaxError = 501
      CommandNotImplemented = 502
      BadCommandSequence = 503
      NotLoggedIn = 530
      AccountNeeded = 532
      ActionNotTakenFileUnavailable = 550
      ActionAbortedUnknownPageType = 551
      FileActionAborted = 552
      ActionNotTakenFilenameNotAllowed = 553.

end enum.
