enum System.Net.HttpStatusCode:

   def enum
      Continue = 100
      SwitchingProtocols = 101
      OK = 200
      Created = 201
      Accepted = 202
      NonAuthoritativeInformation = 203
      NoContent = 204
      ResetContent = 205
      PartialContent = 206
      MultipleChoices = 300
      Ambiguous = 300
      MovedPermanently = 301
      Moved = 301
      Found = 302
      Redirect = 302
      SeeOther = 303
      RedirectMethod = 303
      NotModified = 304
      UseProxy = 305
      Unused = 306
      TemporaryRedirect = 307
      RedirectKeepVerb = 307
      BadRequest = 400
      Unauthorized = 401
      PaymentRequired = 402
      Forbidden = 403
      NotFound = 404
      MethodNotAllowed = 405
      NotAcceptable = 406
      ProxyAuthenticationRequired = 407
      RequestTimeout = 408
      Conflict = 409
      Gone = 410
      LengthRequired = 411
      PreconditionFailed = 412
      RequestEntityTooLarge = 413
      RequestUriTooLong = 414
      UnsupportedMediaType = 415
      RequestedRangeNotSatisfiable = 416
      ExpectationFailed = 417
      UpgradeRequired = 426
      InternalServerError = 500
      NotImplemented = 501
      BadGateway = 502
      ServiceUnavailable = 503
      GatewayTimeout = 504
      HttpVersionNotSupported = 505.

end enum.
