interface System.Runtime.InteropServices.ComTypes.IAdviseSink:

   method public void OnDataChange(input format as System.Runtime.InteropServices.ComTypes.FORMATETC, input stgmedium as System.Runtime.InteropServices.ComTypes.STGMEDIUM).

   method public void OnViewChange(input aspect as integer, input index as integer).

   method public void OnRename(input moniker as System.Runtime.InteropServices.ComTypes.IMoniker).

   method public void OnSave().

   method public void OnClose().

end interface.
