interface System.Runtime.InteropServices.ComTypes.IBindCtx:

   method public void RegisterObjectBound(input punk as System.Object).

   method public void RevokeObjectBound(input punk as System.Object).

   method public void ReleaseBoundObjects().

   method public void SetBindOptions(input pbindopts as System.Runtime.InteropServices.ComTypes.BIND_OPTS).

   method public void GetBindOptions(input pbindopts as System.Runtime.InteropServices.ComTypes.BIND_OPTS).

   method public void GetRunningObjectTable(input pprot as System.Runtime.InteropServices.ComTypes.IRunningObjectTable).

   method public void RegisterObjectParam(input pszKey as character, input punk as System.Object).

   method public void GetObjectParam(input pszKey as character, input ppunk as System.Object).

   method public void EnumObjectParam(input ppenum as System.Runtime.InteropServices.ComTypes.IEnumString).

   method public integer RevokeObjectParam(input pszKey as character).

end interface.
