interface System.Runtime.InteropServices.ComTypes.IEnumMoniker:

   method public integer Next(input celt as integer, input rgelt as System.Runtime.InteropServices.ComTypes.IMoniker extent, input pceltFetched as System.IntPtr).

   method public integer Skip(input celt as integer).

   method public void Reset().

   method public void Clone(input ppenum as System.Runtime.InteropServices.ComTypes.IEnumMoniker).

end interface.
