interface System.Runtime.InteropServices.ComTypes.IEnumSTATDATA:

   method public integer Next(input celt as integer, input rgelt as System.Runtime.InteropServices.ComTypes.STATDATA extent, input pceltFetched as System.Int32 extent).

   method public integer Skip(input celt as integer).

   method public integer Reset().

   method public void Clone(input newEnum as System.Runtime.InteropServices.ComTypes.IEnumSTATDATA).

end interface.
