interface System.Runtime.InteropServices.ComTypes.IRunningObjectTable:

   method public integer Register(input grfFlags as integer, input punkObject as System.Object, input pmkObjectName as System.Runtime.InteropServices.ComTypes.IMoniker).

   method public void Revoke(input dwRegister as integer).

   method public integer IsRunning(input pmkObjectName as System.Runtime.InteropServices.ComTypes.IMoniker).

   method public integer GetObject(input pmkObjectName as System.Runtime.InteropServices.ComTypes.IMoniker, input ppunkObject as System.Object).

   method public void NoteChangeTime(input dwRegister as integer, input pfiletime as System.Runtime.InteropServices.ComTypes.FILETIME).

   method public integer GetTimeOfLastChange(input pmkObjectName as System.Runtime.InteropServices.ComTypes.IMoniker, input pfiletime as System.Runtime.InteropServices.ComTypes.FILETIME).

   method public void EnumRunning(input ppenumMoniker as System.Runtime.InteropServices.ComTypes.IEnumMoniker).

end interface.
