class System.Runtime.InteropServices.ComTypes.STATSTG
   inherits System.ValueType
   final:

   def public variable pwcsName as character.

   def public variable type as integer.

   def public variable cbSize as int64.

   def public variable mtime as System.Runtime.InteropServices.ComTypes.FILETIME.

   def public variable ctime as System.Runtime.InteropServices.ComTypes.FILETIME.

   def public variable atime as System.Runtime.InteropServices.ComTypes.FILETIME.

   def public variable grfMode as integer.

   def public variable grfLocksSupported as integer.

   def public variable clsid as System.Guid.

   def public variable grfStateBits as integer.

   def public variable reserved as integer.

   constructor public STATSTG():
   end constructor.

end class.
