class System.Security.Cryptography.RSAParameters
   inherits System.ValueType
   final:

   def public variable Exponent as System.Byte extent.

   def public variable Modulus as System.Byte extent.

   def public variable P as System.Byte extent.

   def public variable Q as System.Byte extent.

   def public variable DP as System.Byte extent.

   def public variable DQ as System.Byte extent.

   def public variable InverseQ as System.Byte extent.

   def public variable D as System.Byte extent.

   constructor public RSAParameters():
   end constructor.

end class.
