enum System.Windows.Forms.ListViewHitTestLocations flags:

   def enum
      None = 1
      Image = 2
      Label = 4
      BelowClientArea = 16
      RightOfClientArea = 32
      LeftOfClientArea = 64
      AboveClientArea = 256
      StateImage = 512.

end enum.
