interface Telerik.WinControls.Commands.ICommand:

   def public property Name as character
      get.

   def public property Type as character
      get.

   def public property OwnerType as System.Type
      get.
      set.

   def public property ContextType as System.Type
      get.
      set.

   def public event CanExecuteChanged signature void (input sender as System.Object, input e as System.EventArgs).

   def public event HandleExecute signature void (input sender as System.Object, input e as Telerik.WinControls.Commands.CommandEventArgs).

   def public event Executed signature void (input sender as System.Object, input e as Telerik.WinControls.Commands.CommandEventArgs).

   method public System.Object Execute().

   method public System.Object Execute(input settings as System.Object extent).

   method public logical CanExecute(input target as System.Object).

   method public character ToString().

end interface.
