class Telerik.WinControls.PropertyChangeBehaviorCollection
   inherits System.Collections.Generic.List
   implements System.Collections.Generic.IList, System.Collections.Generic.ICollection, System.Collections.Generic.IEnumerable, System.Collections.IEnumerable, System.Collections.IList, System.Collections.ICollection, System.Collections.Generic.IReadOnlyList, System.Collections.Generic.IReadOnlyCollection:

   constructor public PropertyChangeBehaviorCollection():
   end constructor.

   constructor public PropertyChangeBehaviorCollection(input capacity as integer):
   end constructor.

end class.
