interface Telerik.WinControls.UI.IEditorHandler:

   method public void HandleEditorKeyDown(input e as System.Windows.Forms.KeyEventArgs).

   method public void HandleEditorKeyPress(input e as System.Windows.Forms.KeyPressEventArgs).

   method public void HandleEditorKeyUp(input e as System.Windows.Forms.KeyEventArgs).

   method public void HandleEditorValidating(input e as System.ComponentModel.CancelEventArgs).

   method public void HandleEditorValidated(input e as System.EventArgs).

   method public void HandleEditorValueChanging(input e as Telerik.WinControls.UI.ValueChangingEventArgs).

   method public void HandleEditorValueChanged(input e as System.EventArgs).

   method public void HandleEditorValidationError(input e as Telerik.WinControls.UI.ValidationErrorEventArgs).

   method public void HideEditor(input editor as Telerik.WinControls.UI.IInputEditor).

   method public void ShowEditor(input editor as Telerik.WinControls.UI.IInputEditor).

   method public void WriteValue().

   method public void ReadValue().

end interface.
