interface Telerik.WinControls.UI.IVisualLayoutPart:

   def public property Bounds as System.Drawing.RectangleF
      get.

   def public property DesiredSize as System.Drawing.SizeF
      get.

   def public property Margin as System.Windows.Forms.Padding
      get.
      set.

   def public property Padding as System.Windows.Forms.Padding
      get.
      set.

   method public System.Drawing.SizeF Measure(input availableSize as System.Drawing.SizeF).

   method public System.Drawing.SizeF Arrange(input bounds as System.Drawing.RectangleF).

end interface.
