class Telerik.WinControls.UI.SchedulerTimescale
   inherits System.Object
   implements System.ICloneable, System.ComponentModel.INotifyPropertyChanged:

   def protected variable displayFormat as character.

   def protected variable scale as Telerik.WinControls.UI.Timescales.

   def public property ScalingFactor as integer
      get.

   def public property DisplayedCellsCount as integer
      get.
      set.

   def public property Timescale as Telerik.WinControls.UI.Timescales
      get.

   def public property Visible as logical
      get.
      set.

   def public property Name as character
      get.

   def public property Format as character
      get.
      set.

   def public event PropertyChanged signature void (input sender as System.Object, input e as System.ComponentModel.PropertyChangedEventArgs).

   constructor public SchedulerTimescale():
   end constructor.

   method public final override System.Object Clone():
   end method.

   method protected void OnPropertyChanged(input propertyName as character):
   end method.

end class.
