class Telerik.WinControls.UI.ScrollBarParameters
   inherits System.ValueType
   final:

   def public variable Minimum as integer.

   def public variable Maximum as integer.

   def public variable SmallChange as integer.

   def public variable LargeChange as integer.

   constructor public ScrollBarParameters():
   end constructor.

   constructor public ScrollBarParameters(input minimum as integer, input maximum as integer, input smallChange as integer, input largeChange as integer):
   end constructor.

end class.
