class OpenEdge.Core.StringConstant abstract:

	constructor public StringConstant ():
	end.

	define public static property TAB as character no-undo
		public get.

	define public static property CR as character no-undo
		public get.

	define public static property LF as character no-undo
		public get.

	define public static property CRLF as character no-undo
		public get.

	define public static property ESC as character no-undo
		public get.

	define public static property BACK as character no-undo
		public get.

	define public static property FF as character no-undo
		public get.

	define public static property TILDE as character no-undo
		public get.

	define public static property SEMICOLON as character no-undo
		public get.

	define public static property SINGLE_QUOTE as character no-undo
		public get.

	define public static property DOUBLE_QUOTE as character no-undo
		public get.

	define public static property BACKSLASH as character no-undo
		public get.

	define public static property CURLY_OPEN as character no-undo
		public get.

	define public static property CURLY_CLOSE as character no-undo
		public get.

	define public static property UNICODE_ESC as character no-undo
		public get.
		private set.

	define public static property SPACE as character no-undo
		public get.

	define public static property UNKNOWN as character no-undo
		public get.

end.
