interface OpenEdge.DataAdmin.IPartitionParent
inherits OpenEdge.DataAdmin.IDataAdminElement:

   define public property DefaultAllocation as character get. set.
   define public property DefaultDataArea as OpenEdge.DataAdmin.IArea get. set.
   define public property DefaultIndexArea as OpenEdge.DataAdmin.IArea get. set.
   define public property DefaultLobArea as OpenEdge.DataAdmin.IArea get. set.
   define public property Description as character get. set.
   define public property Name as character get. set.
   
end interface.