interface OpenEdge.DataAdmin.ISequence
inherits OpenEdge.DataAdmin.IDataAdminElement:

   define public property CurrentValue as int64 get. set.
   define public property IncrementValue as int64 get. set.
   define public property InitialValue as int64 get. set.
   define public property IsCyclic as logical get. set.
   define public property IsMultitenant as logical get. set.
   define public property MaximumValue as int64 get. set.
   define public property MinimumValue as int64 get. set.
   define public property Name as character get. set.
   define public property Schema as OpenEdge.DataAdmin.ISchema get. set.
   define public property SequenceValues as OpenEdge.DataAdmin.ISequenceValueMap get. et.

end interface.