interface OpenEdge.DataAdmin.Util.IDataAdminUtility:

   method public OpenEdge.DataAdmin.Message.IUtilityRequest GetRequest ().
   
   method public void ImportOptions (input a as character).
   
   method public void SetResponse (input o as OpenEdge.DataAdmin.Message.IUtilityResponse).
   
   define public property LogStatus as logical get. set.
   define public property Name as character get. set.
   define public property StatusFileName as character get. set.
   define public property StatusInterval as integer get. set.
   define public property TaskName as character get. set.
   
end interface.