class OpenEdge.Logging.LoggerFilterRegistry:

	constructor public LoggerFilterRegistry ():
	end.

	define public static property LOG_MANAGER_WRITER as character no-undo
		public get.

	define public static property NAMED_FILE_WRITER as character no-undo
		public get.

	define public static property VOID_WRITER as character no-undo
		public get.

	define public static property DEFAULT_WRITER as character no-undo
		public get.

	define public static property MSG_STMT_WRITER as character no-undo
		public get.

	define public static property JSON_LOG_WRITER as character no-undo
		public get.

	define public static property ABL_SUBSTITUTE_FORMAT as character no-undo
		public get.

	define public static property LOG_MANAGER_FORMAT as character no-undo
		public get.

	define public static property STACK_WRITER_FORMAT as character no-undo
		public get.

	define public static property FULL_TEXT_FORMAT as character no-undo
		public get.

	define public static property ERROR_FORMAT as character no-undo
		public get.

	define public static property TOKEN_FORMAT as character no-undo
		public get.

	define public static property ANON_FORMAT as character no-undo
		public get.

	define public static property MDC_FORMAT as character no-undo
		public get.

	define public static property REPLACE_TOKENS_FORMAT as character no-undo
		public get.

	define public static property Registry as OpenEdge.Core.Util.BuilderRegistry no-undo
		public get.
		private set.

end.
