class OpenEdge.Logging.MDC:

	method public static void Put ( pKey as character, pValue as character):
	end.

	method public static logical Has ( pKey as character):
	end.

	method public static character Get ( pKey as character):
	end.

	method public static void Remove ( pKey as character):
	end.

	method public static void Clear ():
	end.

	method public static logical IsEmpty ():
	end.

end.
