enum OpenEdge.Net.HTTP.StatusCodeEnum:

	define enum
		Unknown = -1
		None = 0
		Continue = 100
		SwitchingProtocols = 101
		Processing = 102
		OK = 200
		Created = 201
		Accepted = 202
		NonAuthoritativeInformation = 203
		NoContent = 204
		ResetContent = 205
		PartialContent = 206
		Multi-Status = 207
		AlreadyReported = 208
		IMUsed = 226
		MultipleChoices = 300
		MovedPermanently = 301
		Found = 302
		SeeOther = 303
		NotModified = 304
		UseProxy = 305
		TemporaryRedirect = 307
		PermanentRedirect = 308
		BadRequest = 400
		Unauthorized = 401
		PaymentRequired = 402
		Forbidden = 403
		NotFound = 404
		MethodNotAllowed = 405
		NotAcceptable = 406
		ProxyAuthenticationRequired = 407
		RequestTimeOut = 408
		Conflict = 409
		Gone = 410
		LengthRequired = 411
		PreconditionFailed = 412
		RequestEntityTooLarge = 413
		RequestURITooLarge = 414
		UnsupportedMediaType = 415
		RequestedRangeNotSatisfiable = 416
		ExpectationFailed = 417
		MisdirectedRequest = 421
		UnprocessableEntity = 422
		Locked = 423
		FailedDependency = 424
		UpgradeRequired = 426
		PreconditionRequired = 428
		TooManyRequests = 429
		RequestHeaderFieldsTooLarge = 431
		InternalServerError = 500
		NotImplemented = 501
		BadGateway = 502
		ServiceUnavailable = 503
		GatewayTimeout = 504
		HTTPVersionNotSupported = 505
		VariantAlsoNegotiates = 506
		InsufficientStorage = 507
		LoopDetected = 508
		NotExtended = 510
		NetworkAuthenticationRequired = 511.
end.
