
class Progress.Database.VSTTableId:

   define public static property ActBufferId as int64
      get.

   define public static property ActIndexId  as int64
      get.

   define public static property ActIOFileId as int64
      get.

   define public static property ActIOTypeId as int64
      get.

   define public static property ActOtherId as int64
      get.

   define public static property ActRecordId as int64
      get.

   define public static property ActSpaceId as int64
      get.

   define public static property ActSummaryId as int
      get.

   define public static property BlockId as integer
      get.

   define public static property BuffStatusId as integer
      get.

   define public static property DbStatusId as integer
      get.

   define public static property FileListId as integer
      get.

   define public static property IndexStatId as int64
      get.

   define public static property MstrBlkId as integer
      get.

   define public static property StatBaseId as int64
      get.

   define public static property TableStatId as int
      get.

   define public static property TransId as integer
      get.

   define public static property UserIOId as int64
      get.

   define public static property UserIndexStatId as int64
      get.

   define public static property UserTableStatId as int64
      get.

end class.
